en	You will be redirected to the login page in a few seconds.

en	Please, check your mailbox.

en	A link to reset your password has been sent to you.

en	For security reasons, you cannot connect to the back office until you have:

en	deleted the /install folder

en	renamed the /admin folder (e.g. %s)

en	Please then access this page by the new URL (e.g. %s)

en	If this email address has been registered in our store, you will receive a link to reset your password.

en	For security reasons, you must also delete the /install folder.

en	SSL is activated. However, your IP is allowed to enter unsecure mode for maintenance or local IP issues.

en	SSL is activated. Please connect using the following link to [1]log in to secure mode (https://)[/1]

en	The employee does not exist, or the password provided is incorrect.

en	This employee does not manage the shop anymore (either the shop has been deleted or permissions have been revoked).

en	This account does not exist.

en	You can reset your password every %interval% minute(s) only. Please try again later.

en	Please, check your mailbox. A link to reset your password has been sent to you.

en	An error occurred while attempting to reset your password.

en	Some identification information is missing.

en	The password is missing: please enter your new password.

en	The password is not in a valid format.

en	The confirmation is empty: please fill in the password confirmation as well.

en	The confirmation password doesn't match. Please double check both passwords.
en	The confirmation password doesn't match. Please double-check both passwords.

en	Your password reset request expired. Please start again.

en	An error occurred while attempting to change your password.

en	The password has been changed successfully.

en	If this email address has been registered in our store, you will receive a link to reset your password at %email%.

en	The confirmation password doesn't match. Please double-check both passwords.